/*
Navicat MySQL Data Transfer

Source Server         : localhost_3306
Source Server Version : 50617
Source Host           : localhost:3306
Source Database       : dm_7in6_com

Target Server Type    : MYSQL
Target Server Version : 50617
File Encoding         : 65001

Date: 2018-07-28 12:40:48
*/

SET FOREIGN_KEY_CHECKS=0;

-- ----------------------------
-- Table structure for `ewr_label_config`
-- ----------------------------
DROP TABLE IF EXISTS `ewr_label_config`;
CREATE TABLE `ewr_label_config` (
  `id` tinyint(2) NOT NULL AUTO_INCREMENT,
  `label_type` tinyint(1) DEFAULT NULL COMMENT '标签类型（1：大标签2：小标签）',
  `totalnum` int(6) DEFAULT '120000' COMMENT '总张数',
  `bagnum` int(3) DEFAULT '98' COMMENT '包数',
  `paller_number` int(4) DEFAULT '1' COMMENT '托盘编号',
  `print_num` tinyint(2) DEFAULT '3' COMMENT '批量打印个数',
  `present_num` tinyint(3) DEFAULT NULL COMMENT '当前版号',
  `mixture_num` tinyint(3) DEFAULT NULL COMMENT '混板编号',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8;

-- ----------------------------
-- Records of ewr_label_config
-- ----------------------------
